-- 2024-07-31 （未执行）
alter table project_info add longitude numeric(10,2) null;
exec sp_addextendedproperty N'MS_Description', N'经度', N'schema', N'dbo', N'table', N'project_info', N'column', N'longitude';

alter table project_info add latitude numeric(10,2) null;
exec sp_addextendedproperty N'MS_Description', N'纬度', N'schema', N'dbo', N'table', N'project_info', N'column', N'latitude';

alter table project_info add create_time datetime null;
exec sp_addextendedproperty N'MS_Description', N'创建时间', N'schema', N'dbo', N'table', N'project_info', N'column', N'create_time';

alter table project_info add pic_content text null;
exec sp_addextendedproperty N'MS_Description', N'图片内容', N'schema', N'dbo', N'table', N'project_info', N'column', N'pic_content';

-- 2024-08-13 创建字典表数据
CREATE TABLE sys_dict (
    id bigint NOT NULL,
    value nvarchar(100) COLLATE Chinese_PRC_CI_AS NOT NULL,
    label nvarchar(100) COLLATE Chinese_PRC_CI_AS NOT NULL,
    [type] nvarchar(100) COLLATE Chinese_PRC_CI_AS NOT NULL,
    description nvarchar(100) COLLATE Chinese_PRC_CI_AS NOT NULL,
    sort decimal(10,0) NOT NULL,
    create_by nvarchar(50) COLLATE Chinese_PRC_CI_AS NULL,
    create_time datetime2 NULL,
    last_update_by nvarchar(50) COLLATE Chinese_PRC_CI_AS NULL,
    last_update_time datetime2 NULL,
    remarks nvarchar(255) COLLATE Chinese_PRC_CI_AS NULL,
    del_flag tinyint NULL,
    status bit null,
    parent_id bigint null
    CONSTRAINT PK__sys_dict__3213E83F527BBC48 PRIMARY KEY (id)
    );

-- Extended properties

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'字典表', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'编号', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'数据值', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'value';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'标签名', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'label';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'类型', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'type';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'描述', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'description';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'排序（升序）', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'sort';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'创建人', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'create_by';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'创建时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'create_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'更新人', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'last_update_by';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'更新时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'last_update_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'备注信息', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'remarks';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'是否删除  -1：已删除  0：正常', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'del_flag';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'状态（0正常 1停用）', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'status';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'父id：0最高级', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'sys_dict', @level2type=N'Column', @level2name=N'parent_id';

-- 2024-08-22
-- 资产设备管理
create table devices_manage
(
    id bigint identity primary key not null,                    -- id
    device_name nvarchar(100) null,                             -- 设备名称
    device_brand nvarchar(100) null,                            -- 设备品牌
    em_brand nvarchar(100) null,                                -- 机电品牌
    rated_input_power numeric(24, 2) null,                      -- 额定输入功率
    rated_refrigeration_capacity numeric(24, 2) null,           -- 额定制冷量
    rated_cop numeric(24, 2) null,                              -- 额定COP
    rated_flow numeric(24, 2) null,                             -- 额定流量
    production_time datetime null,                              -- 生产日期
    create_time datetime null,                                  -- 创建时间
    update_time datetime null,                                  -- 更新时间
    create_by nvarchar(50) null,                                -- 创建人
    is_frequency bit null,                                      -- 是否变频
    device_type bigint null,                                    -- 设备类型id（字典配置）
    system_id bigint null,                                      -- 项目类型id
    project_id bigint null,                                      -- 项目类型id
    remark nvarchar(255) null,                                  -- 系统id
    grade int null                                              -- 保留
)
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'资产设备管理', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'编号', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'设备名称', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'device_name';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'设备品牌', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'device_brand';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'机电品牌', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'em_brand';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'额定输入功率', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'rated_input_power';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'额定制冷量', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'rated_refrigeration_capacity';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'额定COP', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'rated_cop';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'额定流量', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'rated_flow';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'生产日期', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'production_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'创建时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'create_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'更新时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'update_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'创建人', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'create_by';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'是否变频', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'is_frequency';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'设备类型id（字典配置）', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'device_type';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'项目类型id', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'system_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'系统id', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'project_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'备注', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'remark';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'数据标识', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'grade';

-- 仪表管理
create table meter_manage (
    id bigint identity primary key not null,                    -- 编号
    mt_type bigint null,                                        -- 仪表类型（从字典值获取）
    mt_name nvarchar(100) null,                                 -- 仪表名称
    other_name nvarchar(100) null,                              -- 仪表别名
    mt_brand nvarchar(100) null,                                -- 仪表品牌
    mt_num nvarchar(20) null,                                   -- 仪表表面号
    mt_code nvarchar(20) null,                                  -- 仪表采集码
    register_addr nvarchar(20),                                 -- 寄存器地址
    func_code nvarchar(20) null,                                -- 功能码
    identify_code nvarchar(20) null,                            -- 仪表识别码
    mt_caliber_pulse nvarchar(20) null,                         -- 仪表口径或者脉冲常数
    mt_range numeric(24,3) null,                                -- 仪表范围
    mt_ratio int null,                                          -- 仪表倍率
    mt_init_value numeric(24,3) null,                           -- 初始值
    digits int null,                                            -- 小数位数
    data_type int null,                                         -- 数据类型16位、32位、64位
    cur_value numeric(24,3) null,                               -- 当前值
    cur_time datetime null,                                     -- 当前值时间
    mt_is_sum bit null,                                         -- 是否总表
    create_time datetime null,                                  -- 创建时间
    update_time datetime null,                                  -- 更新时间
    unit nvarchar(20) null,                                     -- 单位
    sort bigint null,                                           -- 排序
    data_com nvarchar(100) null,                                -- 通信端口
    device_id bigint null,                                      -- 对应device_manage的id
    gateway_id bigint null,                                     -- 对应网关管理表gateway_manage的id
    param_id bigint null,                                       -- 对应参数id
    protocol_type bigint null,                                  -- 协议类型(字典表)
    communication_type int NULL,                                -- 通讯方式（字典表）
    remark nvarchar(255) null,                                  -- 备注
    system_id bigint null,                                      -- 系统类型id
    project_id bigint null,                                      -- 项目类型id
    grade int null                                              -- 保留
)

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表管理', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'编号', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表类型（从字典值获取）', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_type_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表名称', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_name';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表别名', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'other_name';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表品牌', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_brand';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表表面号', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_num';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表采集码', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_code';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'寄存器地址', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'register_addr';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'功能码', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'func_code';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表识别码', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'identify_code';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表口径或者脉冲常数', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_caliber_pulse';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表范围', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_range';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表倍率', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_ratio';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'初始值', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'mt_init_value';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'小数位数', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'meter_manage', @level2type=N'Column', @level2name=N'digits';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'数据类型16位、32位、64位', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'data_type';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'当前值', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'cur_value';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'当前值时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'cur_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'是否总表', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'mt_is_sum';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'创建时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'create_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'更新时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'update_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'单位', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'unit';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'排序', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'sort';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'对应device_manage的id', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'device_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'对应网关管理表gateway_manage的id', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'gateway_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'对应参数id', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'param_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'协议类型(字典表)', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'protocol_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'通讯方式', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'communication_type';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'备注', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'remark';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'项目类型ID', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'project_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'系统类型ID', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'system_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'保留', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'devices_manage', @level2type=N'Column', @level2name=N'grade';


-- 网关管理表
CREATE TABLE gateway_manage (
    id bigint identity(1,1) NOT NULL,
    gw_name varchar(100) COLLATE Chinese_PRC_CI_AS NULL,
    gw_ip varchar(20) COLLATE Chinese_PRC_CI_AS NULL,
    gw_addr varchar(100) COLLATE Chinese_PRC_CI_AS NULL,
    port int NULL,
    collection_loop int NULL,
    create_time datetime NULL,
    update_time datetime NULL,
    connect_time datetime NULL,
    internet_card varchar(50) COLLATE Chinese_PRC_CI_AS NULL,
    operator_type int NULL,
    remark varchar(100) COLLATE Chinese_PRC_CI_AS NULL,
    communication_type int NULL,
    grade int NULL,
    system_id bigint null,                                      -- 系统类型id
    project_id bigint null,                                      -- 项目类型id
    CONSTRAINT pk_gateway_manage PRIMARY KEY (id)
);
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'网关管理', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'编号', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'网关名称', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'gw_name';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'网关IP地址', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'gw_ip';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'网关对应的编号地址', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'gw_addr';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'网关端口', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'port';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'采集周期', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'collection_loop';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'创建时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'create_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'更新时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'update_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'连接时间', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'connect_time';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'卡号', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'internet_card';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'运营商类型 0:中国移动 1:中国联通 2:中国电信', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'operator_type';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'备注', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'remark';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'通信类型(字典表)', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'communication_type_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'预留字段', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'grade';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'系统类型id', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'system_id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'项目类型id', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'gateway_manage', @level2type=N'Column', @level2name=N'project_id';

-- 设备采集参数表
create table device_params(
    id bigint primary key identity(1,1) not null,               -- 编号
    mt_type int not null,                                       -- 仪表类型（从字典表中拿）
    baud_rate int not null,                                     -- 波特率
    data_bit int not null,                                      -- 数据位
    stop_bit int not null,                                      -- 停止位
    parity nvarchar(10) not null,                                        -- 校验位
    remark varchar(100) null                                    -- 备注
)
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'设备采集参数表', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'编号', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params', @level2type=N'Column', @level2name=N'id';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'仪表类型(从字典中获取)', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params', @level2type=N'Column', @level2name=N'mt_type';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'波特率', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params', @level2type=N'Column', @level2name=N'baud_rate';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'数据位', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params', @level2type=N'Column', @level2name=N'data_bit';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'停止位', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params', @level2type=N'Column', @level2name=N'stop_bit';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'校验位', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params', @level2type=N'Column', @level2name=N'parity';
EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'备注', @level0type=N'Schema', @level0name=N'dbo', @level1type=N'Table', @level1name=N'device_params', @level2type=N'Column', @level2name=N'remark';

-- 2024-08-22

-- 2028-09-02
ALTER TABLE devices_manage ADD factory_barcode varchar(100) NULL;
EXEC sys.sp_addextendedproperty 'MS_Description', N'出厂条码', 'schema', N'dbo', 'table', N'devices_manage', 'column', N'factory_barcode';
ALTER TABLE devices_manage ADD imu_code varchar(100) NULL;
EXEC sys.sp_addextendedproperty 'MS_Description', N'IMU编码', 'schema', N'dbo', 'table', N'devices_manage', 'column', N'imu_code';

ALTER TABLE meter_manage ADD register_size int DEFAULT 1 NULL;
EXEC sys.sp_addextendedproperty 'MS_Description', N'寄存器大小', 'schema', N'dbo', 'table', N'meter_manage', 'column', N'register_size';

ALTER TABLE meter_manage ADD is_use bit DEFAULT 1 NULL;
EXEC sys.sp_addextendedproperty 'MS_Description', N'当前采集点位是否启用', 'schema', N'dbo', 'table', N'meter_manage', 'column', N'is_use';

